From 0b60c766401ba7f378b3f334e1fef69294848ccc Mon Sep 17 00:00:00 2001
From: Filip Wandzio <contact@philw.dev>
Date: Sun, 5 Oct 2025 22:49:00 +0200
Subject: Fix description

---
 src/lib/components/Main.svelte | 8 +++-----
 1 file changed, 3 insertions(+), 5 deletions(-)

(limited to 'src/lib/components/Main.svelte')

diff --git a/src/lib/components/Main.svelte b/src/lib/components/Main.svelte
index 4739bd2..3af385e 100644
--- a/src/lib/components/Main.svelte
+++ b/src/lib/components/Main.svelte
@@ -2,12 +2,10 @@
     <section id="about" aria-labelledby="about-heading">
         <h2 id="about-heading">About</h2>
         <p>
-            I am a <strong>software engineer</strong> with almost
-            <strong>2 years</strong>
-            of <strong>experience</strong> and
+            I am a <strong>software engineer</strong> and
             <strong>CS major</strong>(ongoing <strong>master's degree</strong>)
-            currently working on web, mobile and embedded software. My tech
-            stack mostly includes <strong>Rust</strong> and
+            currently working on web, mobile and embedded software. My stack
+            mostly includes <strong>Rust</strong> and
             <strong>Svelte</strong>.
         </p>
     </section>
-- 
cgit v1.2.3

